---
title: Running the Next.js Server
label: Next.js
description: Learn how to run the Next.js server on your local machine.
---

First, we can run the Next.js Server by running the following command:

```bash
npm run dev
```

If everything goes well, your server should be running at
[http://localhost:3000](http://localhost:3000).

With the server running, we can now set up our Supabase containers using
Docker. Jump to the next section to learn how to do that.